Oxygenated detectors: 110 hours at 1100 ^oC

Interstrip capacitance (1^{st} and 2^{nd} neighbours each side) after 3 10^{14} p cm^{-2}, oxy. detectors, 4 inch. (111) wafers

Bias (volts)

Interstrip capacitance (pF)