Interstrip capacitance (1^{st} and 2^{nd} neighbours): Micron 1732-2-2 after 3x10^{14} p cm^2

Bias (volts)

Interstrip capacitance (pF/cm)

50 kHz 100 kHz 300 kHz

Strip length = 6.3 cm