ATLAS SCT Noise Occupancy - log scale - Fri Jul 13 10:19:33 2001 - LIVERPOOL Page 1 Run 435 Scan 2 Module 0 (k4_217)

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

Channel Number

100 200 300 400 500 600 700

THRESHOLD (mV)

0 20 40 60 80 100 120 140 Module 0 k4_217 Stream 0 THRESHOLD (mV) Scan

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

Channel Number

100 200 300 400 500 600 700

THRESHOLD (mV)

0 20 40 60 80 100 120 140 Module 0 k4_217 Stream 1 THRESHOLD (mV) Scan

THRESHOLD (mV)

0 20 40 60 80 100 120 140

Log(occupancy)

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 Module 0 k4_217 Stream 0 THRESHOLD (mV) Scan

0.00E+000

THRESHOLD (mV)

0 20 40 60 80 100 120 140

Log(occupancy)

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 Module 0 k4_217 Stream 1 THRESHOLD (mV) Scan

2.32E-005

ATLAS SCT Noise Occupancy - log scale - Fri Jul 13 10:19:33 2001 - LIVERPOOL Page 2 Run 435 Scan 2 Module 0 (k4_217)

THRESHOLD (mV)

0 20 40 60 80 100120140

Log(occupancy)

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 Module 0 k4_217 Stream 0 THRESHOLD (mV) Scan

1.16E-005

0 20 40 60 80 100 120 140 160 875 880 885 890 895 900 905 910 915 Module 0 k4_217 Icc

THRESHOLD (mV)

Icc(mA)

905mA Typical

915mA Max

0 20 40 60 80 100 120 140 160 600 650 700 750 800 850 Module 0 k4_217 Idd

THRESHOLD (mV)

Idd(mA)

615mA Typical

830mA Max

0 20 40 60 80 100 120 140 160 5.6 5.8 6 6.2 6.4 Module 0 k4_217 Power

THRESHOLD (mV)

Power(W)

6

5.63W Typical

6.43W Max