-3. -1.5 0. 1.5 3.-3.

-1.5 0. 1.5 3.

300000

150000

0

Distance from vertex (central)

X

Y

-2 0 2 0

6 1*10

6 2*10

6 3*10

6 4*10

-2 0 2 0

6 1*10

6 2*10

6 3*10

6 4*10