Detector B0031

0.0

200.0

400.0

600.0

800.0

1000.0

1200.0

1400.0

1600.0

1800.0

2000.0

1 3 5 7 9 1 13 15 17 19 21 23 25 27 29 31 3 35 37 39 41 43 Voltage Step

C u r en t (N A ) Hamamatsu readings Our readings