\documentstyle[12pt,epsfig]{article}
\setlength{\oddsidemargin}{1mm}
\setlength{\evensidemargin}{1mm}
 \setlength{\topmargin}{-10mm}
 \setlength{\textwidth}{165mm}
\setlength{\parindent}{0cm}
\setlength{\parskip}{5mm}
\setlength{\textheight}{240mm}

\begin{document}        

\begin{figure}
\begin{center}
\mbox{\epsfig{figure=section-1.ps,width=6cm,height=6cm,
bbllx=25pt,bblly=140pt,bburx=550pt,bbury=690pt}}
\end{center}
\end{figure}



\end{document}




