Study of Cable Capacitance (pF/m) versus pitch

0

0.1

0.2

0.3

0.4

0.5

40 60 80 100 120 140 160 180 200

Ctot CNN CNNN Cedge

Meas. points

pitch (μm) capacitance (pF)