-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0

20

40

60

80

100

120

140

160

180

200

220

hist3 Nent = 6856 Mean = 0.01714 RMS = 0.5623

Mu + delta z0_{hist3}

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2 0

20

40

60

80

100

120

140

160

180

hist4 Nent = 5553 Mean = -0.007152 RMS = 0.5706

Mu - delta z0_{hist4}