-0.01 -0.005 0 0.005 0.01 0

50

100

150

200

250

300

350

400

450

hist3

Nent = 6856

Mean = -0.0005256

RMS = 0.001378

Chi2 / ndf = 241.6 / 91

7.212 ± Constant = 439.1

1.459e-05 ± Mean = -0.0004908

1.249e-05 ± Sigma = 0.001169

Mu + delta phi_{hist3}

± ± ±

-0.01 -0.005 0 0.005 0.01 0

50

100

150

200

250

300

350

400 hist4

Nent = 5553

Mean = -0.0006668

RMS = 0.001416

Chi2 / ndf = 182.7 / 84

6.349 ± Constant = 346.5

1.663e-05 ± Mean = -0.0006373

1.44e-05 ± Sigma = 0.0012

Mu - delta phi_{hist4}

± ± ±