-0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0

100

200

300

400

500 hist3

Nent = 6856

Mean = -0.02217

RMS = 0.05331

Chi2 / ndf = 219.4 / 83

7.314 ± Constant = 450.9

0.0005738 ± Mean = -0.02092

0.0004779 ± Sigma = 0.04584

Mu + delta d0_{hist3}

± ± ±

-0.4 -0.3 -0.2 -0.1 -0 0.1 0.2 0.3 0.4 0

50

100

150

200

250

300

350

400

hist4

Nent = 5553

Mean = -0.02246

RMS = 0.05454

Chi2 / ndf = 176.8 / 85

6.769 ± Constant = 375.2

0.0006183 ± Mean = -0.02011

0.0005166 ± Sigma = 0.04455

Mu - delta d0_{hist4}

± ± ±