ATLAS SCT Scan Comparison - log scale Run 380 Scan 1 Module 0 Stream 1 (Projection of ch 0 to ch 768) vs Run 385 Scan 1 Module 0 Stream 1 (Projection of ch 0 to ch 768)

10^{-3}

10^{-2}

10^{-1}

1

100 200 300 400 500 600 700

THRESHOLD (mV)

0 20 40 60 80 100 120 140 Module 0 k5_300 Stream 1 THRESHOLD (mV) Scan

10^{-3}

10^{-2}

10^{-1}

1

100 200 300 400 500 600 700

THRESHOLD (mV)

0 20 40 60 80 100 120 140 Module 0 k5_300 Stream 1 THRESHOLD (mV) Scan

THRESHOLD (mV)

0 20 40 60 80 100 120 140

Log(occupancy)

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 Module 0 k5_300 Stream 1 THRESHOLD (mV) Scan

THRESHOLD (mV)

0 20 40 60 80 100 120 140

Log(occupancy)

10^{-3}

10^{-2}

10^{-1}

1 Module 0 k5_300 Stream 1 THRESHOLD (mV) Scan