H1 and ZEUS

x = 0.00005, i=21 x = 0.00008, i=20 x = 0.00013, i=19 x = 0.00020, i=18 x = 0.00032, i=17 x = 0.0005, i=16

x = 0.0008, i=15 x = 0.0013, i=14 x = 0.0020, i=13 x = 0.0032, i=12 x = 0.005, i=11 x = 0.008, i=10 x = 0.013, i=9 x = 0.02, i=8 x = 0.032, i=7 x = 0.05, i=6

x = 0.08, i=5 x = 0.13, i=4 x = 0.18, i=3 x = 0.25, i=2

x = 0.40, i=1

x = 0.65, i=0

Q^2/ GeV^2 σ_{r,NC}(x,Q^2) x 2^i

+

HERA I NC e^+p Fixed Target HERAPDF1.0

10^{-3}

10^{-2}

10^{-1}

1

10

10^2

10^3

10^4

10^5

10^6

10^7

1 10 10^2 10^3 10^4 10^5