-310

-210

-110

1

10

-410^{-3}10^{-2}10^{-1}10 1

1

HERAPDF1.0 exp. uncert. model uncert. parametrization uncert. x xf

2 = 1.9 GeV 2Q

vxu vxd xS

xg

H1 and ZEUS

1