η

-1 -0.5 0

ϕ

345 350 355 360

E(GeV)

0

20

40

60

80

Ch.

0 50 100

P.H.

0 10 20 30

CES/S:Max.Ph=30.796@Ch.63 CES/W:Max.Ph=26.7862@Ch.24 CPR/W:Max.Ph=5263.84@Ch.2

Event : 69435 Run : 161830 EventType : DATA | Unpresc: 0,1,33,34,35,4,8,9,11,44,13,14,48,17,20,21,23,24,25,27,28 Presc: 0,33,34,4,8,44,14,48,20,24,27 WEST Wedge Module 23