ATLAS SCT Module Test - Wed Jul 11 12:20:34 2001 Run 426 Scan 6 Module 0 Link 0 - THRESHOLD (mV) from 0.00 to 450.00 in 5.00 steps, total 91 points

Chip 0 Chip 1 Chip 2 Chip 3 Chip 4 Chip 5

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal0Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal0Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal0Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal0Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal0Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal0Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal1Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal1Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal1Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal1Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal1Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal1Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal2Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal2Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal2Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal2Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal2Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal2Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal3Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal3Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal3Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal3Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal3Nent = 0

THRESHOLD (mV)

050100150200250300350400450 0 200 400 600 800 1000 scurves cal3Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0