ATLAS SCT Module Test - Wed Jun 13 15:25:16 2001 Run 257 Scan 8 Module 0 Link 0 - THRESHOLD (mV) from 0.00 to 250.00 in 5.00 steps, total 51 points

Chip 0 Chip 1 Chip 2 Chip 3 Chip 4 Chip 5

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal0 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal1 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal2 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal3 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal3 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal3 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal3 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal3 Nent = 0

THRESHOLD (mV)

0 50 100 150 200 250 0 200 400 600 800 1000

scurves cal3 Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0

0

Nent = 0