ATLAS SCT Noise Occupancy - log scale - Mon Nov 04 12:42:23 2002 - UNKNOWN Page 1 Run 605 Scan 44 Module 0 (k5_302)

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

Channel Number

100 200 300 400 500 600 700

THRESHOLD (mV)

0 20 40 60 80 100 120 140 Module 0 k5_302 Stream 0 THRESHOLD (mV) Scan

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

Channel Number

100 200 300 400 500 600 700

THRESHOLD (mV)

0 20 40 60 80 100 120 140 Module 0 k5_302 Stream 1 THRESHOLD (mV) Scan

THRESHOLD (mV)

0 20 40 60 80 100 120 140

Log(occupancy)

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 Module 0 k5_302 Stream 0 THRESHOLD (mV) Scan

8.93E-006

THRESHOLD (mV)

0 20 40 60 80 100 120 140

Log(occupancy)

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 Module 0 k5_302 Stream 1 THRESHOLD (mV) Scan

7.52E-006