Run 427 Scan 1 Burst 91 Run_tsent 364000 Run_ercnt 0

Scan of THRESHOLD (mV) from 0.0 to 450.0 steps 5.0

0

200

400

600

800

1000

Channel Number

100 200 300 400 500 600 700

THRESHOLD (mV)

0 50 100 150 200 250 300 350 400 450 h_scan0 Nent = 98304

Module 0 k4_208 Stream 0 THRESHOLD (mV) Scan h_scan0

0

200

400

600

800

1000

Channel Number

100 200 300 400 500 600 700

THRESHOLD (mV)

0 50 100 150 200 250 300 350 400 450 h_scan1 Nent = 98304

Module 0 k4_208 Stream 1 THRESHOLD (mV) Scan h_scan1

Channel Number

100 200 300 400 500 600 700 0 10 20 30 40 50 60 70 h_sigma0 Nent = 768

Module 0 k4_208 Stream 0 Fitted Sigma h_sigma0

Channel Number

100 200 300 400 500 600 700 0

20

40

60

80

100 h_sigma1 Nent = 750

Module 0 k4_208 Stream 1 Fitted Sigma h_sigma1

Channel Number

100 200 300 400 500 600 700 0 10 20 30 40 50 60 70 80 h_chisq0 Nent = 768

Module 0 k4_208 Stream 0 Chisq/NDF h_chisq0

Channel Number

100 200 300 400 500 600 700 0

20

40

60

80

100 h_chisq1 Nent = 750

Module 0 k4_208 Stream 1 Chisq/NDF h_chisq1

Channel Number

100 200 300 400 500 600 700 0 0.5 1 1.5 2 2.5 3 3.5 4 h_code0 Nent = 768

Module 0 k4_208 Stream 0 Fit Code h_code0

Channel Number

100 200 300 400 500 600 700 0 0.5 1 1.5 2 2.5 3 3.5 4 h_code1 Nent = 768

Module 0 k4_208 Stream 1 Fit Code h_code1