ATLAS SCT Noise Occupancy - log scale - Thu Feb 27 16:02:49 2003 - University of Liverpool Page 1 Run 925 Scan 6 Module 0 (K5-507) - Type .

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

Channel Number

100 200 300 400 500 600 700

THRESHOLD (mV)

0 20 40 60 80 100 120 140 Module 0 K5-507 Stream 0 THRESHOLD (mV) Scan

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1

Channel Number

100 200 300 400 500 600 700

THRESHOLD (mV)

0 20 40 60 80 100 120 140 Module 0 K5-507 Stream 1 THRESHOLD (mV) Scan

THRESHOLD (mV)

0 20 40 60 80 100 120 140

Log(occupancy)

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 Module 0 K5-507 Stream 0 THRESHOLD (mV) Scan

3.14E-005

THRESHOLD (mV)

0 20 40 60 80 100 120 140

Log(occupancy)

10^{-7}

10^{-6}

10^{-5}

10^{-4}

10^{-3}

10^{-2}

10^{-1} 1 Module 0 K5-507 Stream 1 THRESHOLD (mV) Scan

3.06E-005